SET NAMES utf8mb4 COLLATE utf8mb4_unicode_ci;

ALTER TABLE admin_app_splash_screens
  ADD COLUMN display_duration_ms INT NOT NULL DEFAULT 3000 COMMENT '开屏展示时长，毫秒；0 表示客户端默认值'
  AFTER description;
