ALTER TABLE `user_login_logger`
  ADD COLUMN `ip_country_code` varchar(16) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '登录IP国家码' AFTER `ip`,
  ADD COLUMN `ip_country_name` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '登录IP国家/地区名称' AFTER `ip_country_code`,
  ADD COLUMN `ip_region` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '登录IP地区/省' AFTER `ip_country_name`,
  ADD COLUMN `req_zone_id` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '请求时区' AFTER `ip_region`,
  ADD COLUMN `login_blocked` tinyint(1) NOT NULL DEFAULT 0 COMMENT '是否被登录访问校验屏蔽' AFTER `req_zone_id`,
  ADD COLUMN `block_reason` varchar(128) CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci NOT NULL DEFAULT '' COMMENT '登录访问校验屏蔽原因' AFTER `login_blocked`;
